-- Memo Intake Upgrade PR-2B (3/4) — documents.ai_event_confidence 컬럼 추가
-- 4B triage 의 ai_event_kind 신뢰도 (0.00–1.00). full-auto promote 결정 임계값에 활용.

ALTER TABLE documents
    ADD COLUMN IF NOT EXISTS ai_event_confidence NUMERIC(3, 2) CHECK (ai_event_confidence IS NULL OR (ai_event_confidence >= 0 AND ai_event_confidence <= 1));
