-- 자동화 워커 상태 저장 (증분 동기화용)
CREATE TABLE automation_state (
    id          BIGSERIAL PRIMARY KEY,
    job_name    VARCHAR(50) NOT NULL UNIQUE,
    last_check_value TEXT,
    last_run_at TIMESTAMPTZ,
    updated_at  TIMESTAMPTZ DEFAULT NOW()
);
