-- 설비 관리 설정 (phpMyAdmin용 단순 버전)
-- phpMyAdmin에서 가져오기로 실행

-- ============================================
-- STEP 2: 기존 TKP 데이터 삭제
-- ============================================
DELETE FROM equipments WHERE equipment_code LIKE 'TKP-%';

-- ============================================
-- STEP 3: 65개 설비 데이터 입력
-- ============================================

INSERT INTO equipments (equipment_code, equipment_name, model_name, specifications, serial_number, installation_date, supplier, purchase_price, manufacturer, status) VALUES
('TKP-001', 'AIR COMPRESSOR', 'AR10E', '7.5KW(10HP)', 'K603023Y', '2016-06-01', '지티씨', NULL, '경원', 'active'),
('TKP-002', 'TURN TABLE', 'YCT-200T', '220V', NULL, '2016-05-30', '형진종합공구', 3600000, '유체기계', 'active'),
('TKP-003', 'BAND SAW(中)', 'CY300W', '1500W*380V', '20150943', '2016-05-30', '형진종합공구', 4800000, '유림싸이겐', 'active'),
('TKP-004', 'BAND SAW(小)', 'XB-180WA', '180(VICE)', NULL, '2016-05-30', '형진종합공구', 2700000, '렉스', 'active'),
('TKP-005', 'BAND SAW(小)', 'XB-180WA', '180(VICE)', NULL, '2019-05-30', NULL, NULL, '렉스', 'active'),
('TKP-006', 'TIG용접기', 'DAESUNG-500DT', '500A', 'TEAG0168-001', '2016-05-30', '형진종합공구', 2200000, '대성용접기', 'active'),
('TKP-007', 'TIG용접기', 'DAESUNG-500DT', '500A', 'TEAG0168-002', '2016-05-30', '형진종합공구', 2200000, '대성용접기', 'active'),
('TKP-008', 'TIG용접기', 'DAESUNG-500DT', '500A', 'TEAG0168-003', '2016-05-30', '형진종합공구', 2200000, '대성용접기', 'active'),
('TKP-009', 'CO2용접기', 'COD-500A', '500A', '10880', '2016-05-30', '형진종합공구', 2000000, '대성용접기', 'active'),
('TKP-010', 'O2용접기', 'GSORK', '220V', NULL, '2016-05-30', '형진종합공구', 620000, '재현오토닉스', 'active'),
('TKP-011', 'PIPE BEVELLING MACHINE', 'S-200LT_MT(테이블포함)', '2" ~ 8"', 'KR-17030007', '2017-03-29', 'DCS ENG', 12000000, 'DCS ENG', 'active'),
('TKP-012', 'CO2용접기', '500MX', '220/380V,500A', NULL, '2017-08-02', '현대용접기', 1800000, '현대용접기', 'active'),
('TKP-013', '프라즈마', 'Perfect-150AP', '220/380/440V,140A', NULL, '2017-08-02', '현대용접기', 1900000, '퍼펙트대대', 'active'),
('TKP-014', '터닝로라', 'JK-5-TR', '5TON/380V', NULL, '2017-09-08', '정일기공', 5700000, '정일기공', 'active'),
('TKP-015', '터닝로라', 'JK-5-TR', '5TON/380V', NULL, '2017-09-08', '정일기공', 5700000, '정일기공', 'active'),
('TKP-016', 'TIG용접기', 'Perfect-500PT', '500A/350A', 'TJAD017B-005', '2017-10-18', '현대용접기', 1600000, '퍼펙트대대', 'active'),
('TKP-017', 'TIG용접기', 'Perfect-500PT', '500A/350A', 'TJAD017B-006', '2017-10-18', '현대용접기', 1600000, '퍼펙트대대', 'active'),
('TKP-018', 'TIG용접기', 'Perfect-500PT', '500A/350A', 'TJAD017B-007', '2017-10-18', '현대용접기', 1600000, '퍼펙트대대', 'active'),
('TKP-019', '전해연마기', 'ONB-8000VP', '220V/MAX1200W', '8022701', '2018-03-13', '오토기전', 1450000, '메탈브라이트(오토기전)', 'active'),
('TKP-020', '지게차', '50DA-9F', '5000KGS', 'HHKHFV36JJ0000061', '2018-05-10', '현대지게차', 45000000, '현대지게차', 'active'),
('TKP-021', '조방', NULL, '3658*12190', NULL, '2018-05-11', '천우기계공업/삼덕금속', 14200000, '테크니컬코리아', 'active'),
('TKP-022', 'BAND SAW(大)', 'WBS-RC500AN', '3,300kgs / 7.88kw', 'BC50A18-005F001', '2018-05-31', '원공사', 36000000, '원공사', 'active'),
('TKP-023', 'AIR COMPRESSOR', 'AR20E', '0.95Mpa', 'AR020FE358', '2018-06-05', '경원기계', NULL, '경원기계', 'active'),
('TKP-024', 'TURN TABLE', 'YCT-200TA', '220V', NULL, '2018-06-12', '청운종합공구', 3245000, '유체기계', 'active'),
('TKP-025', 'TIG용접기', 'Perfect-500WT', '500A/AC DC', 'ADKAC017B-006', '2018-06-12', '현대용접기', 2400000, '퍼펙트대대', 'active'),
('TKP-026', 'TIG용접기', 'Perfect-500PT', '500A/DC', 'TAAI018B-002', '2018-06-12', '현대용접기', 1900000, '퍼펙트대대', 'active'),
('TKP-027', 'TIG용접기', 'Perfect-500PT', '500A/DC', 'TAAA018B-009', '2018-06-12', '현대용접기', 1900000, '퍼펙트대대', 'active'),
('TKP-028', 'TIG용접기', 'Perfect-500PT', '500A/DC', 'TAAA018B-001', '2018-06-12', '현대용접기', 1900000, '퍼펙트대대', 'active'),
('TKP-029', 'ELECTRIC CHAIN HOIST', 'DSM-2S', '3Ph-60Hz-380V', 'K1806077', '2018-07-06', '청운종합공구', 2300000, '대산', 'active'),
('TKP-030', 'ELECTRIC CHAIN HOIST', 'DSM-2S', '3Ph-60Hz-380V', 'K1807028', '2018-07-10', '청운종합공구', 2300000, '대산', 'active'),
('TKP-031', 'ELECTRIC CHAIN HOIST', 'DSM-2S', '3Ph-60Hz-380V', 'K1807029', '2018-07-10', '청운종합공구', 2300000, '대산', 'active'),
('TKP-032', '만능탭 드릴링머신', 'SF-TDM32', '1.5KW', NULL, '2018-11-09', '㈜애스앤애프', 2927000, '㈜애스앤에프', 'active'),
('TKP-033', '지게차', '30D-9B', '2850KGS', 'HHKHHN51KK0000864', '2019-03-06', '현대지게차', 29400000, '현대지게차', 'active'),
('TKP-034', '갠츄리크레인', 'CRANE - DHG', '50/10Ton x SP20M x T/L50M x H15M', NULL, '2019-05-09', '유진산업기계', 249000000, '반도호이스트', 'active'),
('TKP-035', 'OVER HEAD CRANE', 'CRANE - DHO', '20Ton x SP24.0M x T/L67M x H11M', NULL, '2019-05-09', '유진산업기계', 58000000, '반도호이스트', 'active'),
('TKP-036', 'OVER HEAD CRANE', 'CRANE - DHO', '20Ton x SP24.0M x T/L67M x H11M', NULL, '2019-05-09', '유진산업기계', 58000000, '반도호이스트', 'active'),
('TKP-037', 'OVER HEAD CRANE', 'CRANE - DHO', '5Ton x SP24.0M x T/L67M x H11M', NULL, '2019-05-09', '유진산업기계', 29000000, '반도호이스트', 'active'),
('TKP-038', 'OVER HEAD CRANE', 'CRANE - DHO', '5Ton x SP24.0M x T/L67M x H11M', NULL, '2019-05-09', '유진산업기계', 29000000, '반도호이스트', 'active'),
('TKP-039', '고소작업대', NULL, '250 Kg', NULL, '2019-01-01', NULL, NULL, '㈜쓰리제이테크', 'active'),
('TKP-040', '고소작업대', NULL, '250 Kg', NULL, '2019-01-01', NULL, NULL, '㈜쓰리제이테크', 'active'),
('TKP-041', 'AIR CONDITIONER', '코끼리 냉장고', NULL, NULL, '2019-01-01', NULL, NULL, '㈜에스엔에프', 'active'),
('TKP-042', 'AIR CONDITIONER', NULL, NULL, NULL, '2019-01-01', NULL, NULL, '㈜에스엔에프', 'active'),
('TKP-043', 'AIR CONDITIONER', NULL, NULL, NULL, '2019-01-01', NULL, NULL, '㈜에스엔에프', 'active'),
('TKP-044', '용접흄집진기', NULL, '5 HP / 60 m3/Min', NULL, '2019-01-01', NULL, NULL, NULL, 'active'),
('TKP-045', '용접흄집진기', NULL, '5 HP / 60 m3/Min', NULL, '2019-01-01', NULL, NULL, NULL, 'active'),
('TKP-046', '용접흄집진기', NULL, '5 HP / 60 m3/Min', NULL, '2019-01-01', NULL, NULL, NULL, 'active'),
('TKP-047', '용접흄집진기', NULL, '5 HP / 60 m3/Min', NULL, '2019-01-01', NULL, NULL, NULL, 'active'),
('TKP-048', '용접흄집진기', NULL, '5 HP / 60 m3/Min', NULL, '2019-01-01', NULL, NULL, NULL, 'active'),
('TKP-049', '자동용접기', NULL, NULL, NULL, '2019-01-01', 'Swage-Lok', 50000000, 'Swage-Lok', 'active'),
('TKP-050', 'Magnetic Drill', NULL, NULL, NULL, '2020-01-01', '청운종합공구', NULL, 'NITTO', 'active'),
('TKP-051', 'Magnetic Drill', NULL, NULL, NULL, '2020-01-01', '청운종합공구', NULL, 'Key-Yang', 'active'),
('TKP-052', 'Tube Bending M/C', NULL, NULL, NULL, '2020-01-01', NULL, NULL, 'REMS', 'active'),
('TKP-053', 'Unit Test Panel', NULL, NULL, NULL, '2021-01-01', NULL, NULL, NULL, 'active'),
('TKP-054', '고소작업대', NULL, '500 Kg', NULL, '2021-01-01', NULL, NULL, '㈜쓰리제이테크', 'active'),
('TKP-055', '용접봉 건조기', '주문제작', '박스형', NULL, '2022-05-04', '진원하이텍', 2300000, '진원하이텍', 'active'),
('TKP-056', 'C&T 가공기', 'MS-CTK469', NULL, NULL, '2022-07-20', 'Swage-Lok', 7347600, 'Swage-Lok', 'active'),
('TKP-057', '테이블형 튜브 벤딩기', 'MS-BTT-K', '1/2", 1/4"', NULL, '2022-06-03', 'Swage-Lok', 20000000, 'Swage-Lok', 'active'),
('TKP-058', '자동용접기 헤드', 'SWS-10H-D-15', '1/2"', NULL, '2022-06-03', 'Swage-Lok', 20000000, 'Swage-Lok', 'active'),
('TKP-059', '천장주행크레인', 'HC-75D-13105', '7.5ton', NULL, '2023-06-09', '에이치앤씨', 22800000, '에이치앤씨', 'active'),
('TKP-060', 'AED', 'CU-SP1 Plus', '저출력심장충격기', NULL, '2023-11-09', '제이메디', 1600000, '제이메디', 'active'),
('TKP-061', '베벨머신', 'S-150', 'O.D 20mm ~ 170mm', NULL, '2023-12-12', 'DCSENG', 16000000, 'DCSENG', 'active'),
('TKP-062', '피막제거기', 'CM4_OD_GC', '최대 폭 48mm, 최대 깊이 15mm, 6"이상', NULL, '2023-12-12', 'DCSENG', 2000000, 'DCSENG', 'active'),
('TKP-063', '피막제거기', 'S-CM4_OD', '최대 폭 48mm, 최대 깊이 15mm, 1" 이상', NULL, '2023-12-12', 'DCSENG', 1200000, 'DCSENG', 'active'),
('TKP-064', '텅스텐 가공기', 'S-TGR', '0.89kg, 0.25~3.2', NULL, '2023-12-12', 'DCSENG', 800000, 'DCSENG', 'active'),
('TKP-065', '전동대차', 'LPM15', '2.0 ton', NULL, '2023-12-20', '두산산업차량', 2800000, '두산산업차량', 'active');
